Title: Design and produce a biomechanism.
Course: Biotechnology Foundations in Technology Education (21999) > Section: Understanding Biomedical Engineering

Design and production should include a portfolio (e.g., research, possible solutions, experimentation) and a model of a biomechanism.

Process/Skill Questions:

- What types of human problems can biomechanisms solve?
- How can biomechanisms be designed and produced?
- How does society benefit from the development of biomechanisms?