Title: Perform separation and purification techniques.
Course: Biotechnology Foundations in Technology Education (21999) > Section: Exploring Bioprocessing

Performance should include use of safety procedures (e.g., Clinical Laboratory Improvement Amendment of 1988 [CLIA] guidelines), standard operating procedures, sterilization, and correct disposal of hazardous waste. Techniques include filtration, chromatography, and solvent extraction.

Process/Skill Questions:

- What is the purpose of separation and purification in bioprocessing?
- What products are produced through separation and purification techniques?