Title: (Optional) Troubleshoot various powertrain systems.
Course: Agricultural Power Systems, Advanced (18402-II) > Section: Maintaining and Servicing the Powertrain

Troubleshooting should include all safety procedures, protocols, and instructor and manufacturer specifications and guidelines and

- diagnosing
- disassembling
- reassembling

various powertrain systems, using appropriate tools, equipment, and repair manuals.

Process/Skill Questions:

- What types of measuring devices would be used to determine defective parts?
- When inspecting parts, what visual defects could be expected?