Title: Test the power unit.
Course: Agricultural Power Systems, Advanced (18402-II) > Section: Testing, Servicing, and Repairing the Power Unit

Test should include

- wearing required PPE
- determining the function and power output associated with a battery-, electrical-, or fuel-powered engine
- using appropriate tools, equipment, and repair manuals
- following all required safety procedures, guidelines, protocols, and manufacturer specifications for testing the power unit.

Process/Skill Questions:

- What is a dynamometer? How is it used?