Title: (Optional) Service power take-off drives.
Course: Agricultural Power Systems, Advanced (18402-II) > Section: Maintaining and Servicing the Powertrain

Service should include all safety procedures, protocols, and instructor and manufacturer specifications and guidelines and should include performing maintenance and repairs on power take-off drives, using appropriate tools, equipment, and repair manuals.

Process/Skill Questions:

- How are power take-off drives serviced?
- What precautions should be taken when taking off a power take-off drive?