Title: Troubleshoot the starter.
Course: Agricultural Power Systems, Advanced (18402-II) > Section: Maintaining and Servicing the Starting Circuit

Troubleshooting should include

- wearing required PPE
- identifying why the starter will not work
- making necessary adjustments or repairs using appropriate tools, equipment, and repair manuals
- following all required safety procedures, guidelines, protocols, and manufacturer specifications for starter diagnostic procedures.

Process/Skill Questions:

- What would cause a starter to fail?
- How can a faulty starter be tested?