Title: Explain the operation of the ignition circuit.
Course: Agricultural Power Systems, Advanced (18402-II) > Section: Maintaining and Servicing the Ignition Circuit

Explanation should include the components of the ignition circuit and the function of each.

Process/Skill Questions:

- What are some symptoms that indicate the ignition system isn’t working properly (versus the starting or charging circuit)?
- What are the likely trouble spots where a technician would search first?