Title: Test the charging circuit.
Course: Agricultural Power Systems, Advanced (18402-II) > Section: Maintaining and Servicing the Charging Circuit

Testing should include

- wearing required PPE
- operating a voltmeter, ammeter, and/or carbon pile to analyze the charging system
- following all required safety procedures, guidelines, protocols, and manufacturer specifications for testing the charging circuit.

Process/Skill Questions:

- What is a carbon pile?
- How is a voltmeter used to test the output of a charging circuit?
- How is an ammeter used to test the output of a charging circuit?