Title: (Optional) Service diesel fuel systems.
Course: Agricultural Power Systems, Advanced (18402-II) > Section: Maintaining and Servicing Fuel Systems

Service should include

- wearing required PPE
- checking the various systems
  - engine
  - cooling
  - fuel
  - hydraulic
  - chassis

- using appropriate tools, equipment, repair manuals
- following all required safety procedures, guidelines, protocols, and manufacturer specifications for servicing diesel fuel systems.

Process/Skill Questions:

- What are the differences between a diesel and a gas fuel system?
- What would be the procedures to replace the filters in a diesel system?
- What is the function of the injector pump on a diesel system?