Title: List ways to produce electrical energy.
Course: Electronics/Industrial Robotics Technology (17101-I) > Section: Applying Electronics Fundamentals

List includes an explanation of how electricity is produced using

- friction
- heat
- light
- pressure
- chemical action
- magnetism.

Process/Skill Questions:

- Which electrical energy production occurs naturally?
- What is the most widely used method of producing electricity?
- What are examples of using magnetism to produce electrical energy?