Title: Create schematics, technical drawings, and flowcharts.
Course: Industrial Robotics Technology (21009) > Section: Understanding Graphic Communication in Robotics

Creation should include using standard symbols and legends.

Process/Skill Questions:

- What are the standard symbols used in electrical schematics? Pneumatic schematics?
- What are common types (e.g., exploded assembly diagram, isometric) of mechanical drawings?
- How might a flowchart aid the design of a computer program?