Title: Explain safe working practices around electrical hazards.
Course: Industrial Robotics Technology (21009) > Section: Applying General Safety Standards (Core Safety)

Explanation should include

- identifying equipment used to test electrical circuits
- identifying potential arc flash hazards
- describing safe working conditions
- demonstrating safe work habits.

Process/Skill Questions:

- What is the definition of proximity work?
- What are safe working clearances, according to the National Electric Code (NEC) and the local code?
- What are considered safe working conditions and safe working habits?
- What is the unseen hazard with electrical work?