Title: Demonstrate procedures for maintaining and operating office equipment.
Course: Legal Administration (12008-18) > Section: Managing Office Activities

Demonstration should include following manufacturer’s specifications for

- loading paper
- cleaning equipment, including glass surfaces
- clearing paper jams
- changing toner cartridge
- integrating technologies (e.g., copier to email)
- information security considerations, including encryption.