Title: (Optional) Clean equipment with steam cleaner and/or high-pressure washer.
Course: Agricultural Power Systems (18402-I) > Section: Applying Protective Coatings

Procedure should include

- wearing required PPE for the selected task/application
- explaining hazards associated with steam-cleaning equipment and high-pressure washers
- undergoing safety instruction and testing prior to operating power tools, machinery, or equipment
- following all safety procedures, guidelines, and protocols related to the use of electricity, chemicals, hot water, and exposure to hot parts
- preparation and use of a steam and/or high-pressure washer in accordance with manufacturer specifications
- covering critical parts
- disposing of runoff, chemicals, and grease following local, state and federal guidelines.

Process/Skill Questions:

- What are the best settings for the chosen machine?
- What types of damage can occur when tools and equipment are used improperly?
- Why is it important to follow all procedures when disposing of the runoff chemicals and grease?