Title: Apply cutting fluids.
Course: Precision Machining Technology I (13203-I) > Section: Applying Metalworking Theory

Application should include

- selecting cutting fluids based on the assigned job
- applying the cutting fluids and coolants theory (e.g., selecting appropriate coolants and delivery systems for a selected set of operations, operating machine tools to execute a specific operation, using specified coolants and coolant delivery systems)
- identifying, selecting, and using appropriate coolants and coolant delivery systems
- identifying potential hazards.

Process/Skill Questions:

- Why is coolant used?
- What is soluble oil?
- What are the types of coolants?