Title: Install a side cover or sump.
Course: Small Engine Technology I (20110-I) > Section: Understanding Four-Stroke Engine Operation Theory and Components

Installation should include

- alignment of side cover
- torquing hardware in the correct sequence if applicable
- checking the end play of the crankshaft.

Process/Skill Questions:

- Why is it important to check the end play of the crankshaft?
- Why is torque sequence important?