Title: Demonstrate the steps of diagnostics and troubleshooting.
Course: Small Engine Technology I (20110-I) > Section: Diagnosing and Troubleshooting Small-Engine Equipment

Demonstration should include the following steps:

- Receive information and equipment from customer.
- Verify complaint.
- Determine cause.
- Determine corrective action.
- Determine economic feasibility.

Process/Skill Questions:

- How should an unverifiable complaint be handled?
- What factors influence the economic feasibility?