Title: Syllabus
Course: Building Trades II (17009-II)

Copyright: 2019

Virginia Assignment Code: 8516

Suggested Grade Level: 11, 12

Duration: 36 weeks

Hours: 280

Prerequisites: 8515

CTSO: SkillsUSA

Course Description:

Building Trades II teaches students advanced skills in masonry, carpentry, electricity, and plumbing. The class prepares students to synthesize these valuable skills to build or repair residential structures, using a variety of materials and tools. Students will also learn current residential building codes associated with the trades. Contextual instruction and student participation in co-curricular career and technical student organization (CTSO) activities will develop leadership, interpersonal, and career skills. High-quality work-based learning (HQWBL) will provide experiential learning opportunities related to students' career goals and/or interests, integrated with instruction, and performed in partnership with local businesses and organizations.

Note:

The Virginia Administrative Code regulates the class size for this course. For additional information, see 8VAC20-120-150, "Maximum class size," or contact the Virginia Department of Education Office of Career, Technical, and Adult Education at cte@doe.virginia.gov.

Note: The Virginia Board for Contractors' Individual License and Certification Regulations addresses the requirements and standards of conduct for licenses issued to individuals, which includes tradesmen (i.e., electrical, plumbing, heating, ventilation, air-conditioning [HVAC], and gas fitting.) According to 18VAC 50-30-190 of the Virginia Board for Contractors' Individual License and Certification Regulations, a contractor (i.e., the licensed business) or tradesman (i.e., the licensed individual) cannot perform work outside the scope of their license.

Credentials, Course Sequences, and Career Clusters/Pathways can be found here:

https://www.cteresource.org/career-clusters/architecture-construction/building-trades-ii/