Title: (Optional) Rough-in water supply for a variety of fixtures.
Course: Building Trades II (17009-II) > Section: Plumbing: Roughing-in Water Distribution Components

Roughing-in should include

- selecting from a variety of fixtures, including a washing machine, lavatory, kitchen sink, tank-type water closet, bathtub and/or shower, ice maker, hose bib
- following blueprints, manufacturer specifications, and code.

IRC: Chapter 27 (https://codes.iccsafe.org/content/IRC2018P4) covers a wide variety of plumbing fixtures and installation.

Process/Skill Questions:

- How is the proper size piping for each fixture determined?
- What is the location of the stub-out for each fixture?
- What are the consequences of not correctly locating the stub-out?

NCCER Standards:

Plumbing: Level 1

- 02105-05 Introduction to Plumbing Drawings
- 02106-05 Plastic Pipe and Fittings
- 02107-05 Copper Pipe and Fittings
- 02111-05 Fixtures and Faucets
- 02113-05 Introduction to Water Distribution Systems