Title: Pass the safety exam.
Course: Building Trades II (17009-II) > Section: Core Construction Skills: Applying Basic Construction Safety Standards (Core Safety)

Passing the exam must result from participation in safety training programs, including attending safety meetings and completing periodic demonstration of knowledge and skills gained from program topics (e.g., interpretation of SDS).

Process/Skill Questions:

- How often should one participate in safety training programs? Why?
- What is the relationship between insurance and establishing or validating a continual retraining program for safety?
- What is workers' compensation?

NCCER Standards:

Core Curriculum: Introductory Craft Skills

- 00101-04 Basic Safety
- 00103-04 Introduction to Hand Tools
- 00104-04 Introduction to Power Tools