Title: Explain the importance of following a periodic aircraft maintenance schedule.
Course: Aerospace Technology II (21055-II) > Section: Designing Aircraft

Explanation should include

- creating or using an existing maintenance checklist for inspection purposes
- distinguishing between airfield maintenance problems and those that require implementation in the hangar.

Process/Skill Questions:

- What are the key benefits of following a preventive maintenance schedule?
- How do FAA maintenance requirements differ for commercial and private aircraft?
- What maintenance services are required to be performed by licensed aircraft technicians?
- What maintenance-related differences apply to experimental aircraft vs. certified aircraft?