Title: Demonstrate how system controls increase reliability.
Course: Energy Transmission and Distribution, Advanced (20902-II) > Section: Analyzing the Gas System

Demonstration should include

- designing a system with controls
- reviewing outage data, including seasonal outages
- projecting system outages due to natural forces, external forces, or equipment failure
- determining the reliability of the system.

Process/Skill Questions:

- What are the advantages of using remote-controlled gas valves?
- What is looping?
- What seasonal challenges affect the gas system?