Title: Identify procedures for form maintenance.
Course: Carpentry I (17003-I) > Section: Identifying Elements of Foundations and Forms

Identification should include procedures for cleaning, covering, and storing concrete form materials.

Process/Skill Questions:

- What is the best way to store form materials?
- What are some consequences of not properly storing form materials?