Title: (Optional) Discuss an electrocardiogram (ECG).
Course: Emergency Medical Technician III (14055-III) > Section: Assisting an Advanced Life Support (ALS) Provider with Advanced Procedures

Discussion should include explanation of waveforms.

Process/Skill Questions:

- How does an ECG work?
- When is an ECG indicated for a patient?
- What are the differences between ventricular tachycardia and ventricular fibrillation?
- How are leads placed?
- How do you perform a right-side or 15-lead ECG?