Title: Analyze the effects of common cable casualties.
Course: Telecommunications II (10006-II) > Section: Practicing Cabling and Splicing

Analysis should include

- discussion of common mistakes made during cable installation and termination
- identification of test equipment used for troubleshooting cable system casualties
- interpretation of data collected during the troubleshooting process.

Process/Skill Questions:

- What test equipment is available for troubleshooting cable casualties?
- What are the common causes of casualties in cable installations?
- What are the basic steps of the process employed in troubleshooting cable system casualties?