Title: Demonstrate methods to minimize energy demand in facilities across sectors.
Course: Energy Demand: Sustainability and Efficiency (20901-II) > Section: Understanding Facility Design and Engineering Systems

Demonstration should include outlining the process of minimizing energy demand and identifying considerations during

- planning
- designing
- constructing
- operating/maintaining
- retrofitting (when applicable).

Process/Skill Questions:

- What are the major steps involved in planning, designing, constructing, and operating/maintaining a building?
- Who are the team members involved in planning, designing, constructing, and operating a facility?
- Why are facilities sometimes decommissioned? Why are they sometimes retrofitted?