Title: Describe energy end users.
Course: Energy Demand: Sustainability and Efficiency (20901-II) > Section: Exploring Energy Demand

Description includes

- residential
- commercial
- industrial
- public sector (e.g., government/military)
- transportation
- community (e.g., microgrids).

Process/Skill Questions:

- What sector represents the greatest number of end users in Virginia?
- How does the military end user resemble the residential, commercial, and industrial end users?
- What major innovation could transform the transportation sector?