Title: Verify the operation of the instrument panel gauges and warning/indicator lights; reset the maintenance indicators.
Course: Automotive Technology II (20104-II) > Section: Electrical/Electronic Systems: Lighting, Instrument Cluster, Driver Information, and Body Electrical Systems

Verification should include

- checking the coolant temperature, fuel, vehicle speed, odometer, oil pressure, tachometer
- following procedures for each individual circuit. (Note: Typically, digital and fiber-optic gauges and warning circuits are not serviceable by the automotive service technician but are sent to special repair centers when servicing is required.)

Process/Skill Questions:

- What tool might be used to test sensors?
- What is a common fault of connectors?
- What is the difference between a weather pack connector and a standard connector?