Title: Remove, inspect, and/or replace the generator (alternator).
Course: Automotive Technology II (20104-II) > Section: Electrical/Electronic Systems: Charging System

Procedure should be completed according to service materials and manufacturer guidelines.

Process/Skill Questions:

- What function do diodes have in an alternator?
- What is the first step in removing an alternator?
- What effect would the pulley size have on alternator output?