Title: Identify specific factors that may affect the accuracy of a BP reading.
Course: Nurse Aide (14051) > Section: Unit VII: Basic Skills

Identification should include

- cuff size and placement
- not inflating the cuff sufficiently
- releasing the cuff pressure too quickly
- taking BP multiple times in rapid succession in same arm
- talking and recent physical activity.