Title: Identify the guidelines for good oral hygiene.
Course: Nurse Aide (14051) > Section: Unit VIII: Personal Care Skills

Identification should include

- brushing teeth after each meal and at bedtime
- flossing once a day
- rinsing dentures after each meal
- removing dentures at bedtime and soaking overnight.