Title: Discuss the importance of reporting abnormal observations or changes to the appropriate licensed nurse.
Course: Nurse Aide (14051) > Section: Unit X: Special Needs Clients

Discussion should include reporting Parkinson’s symptoms, such as

- severe trembling
- severe muscle rigidity
- mood swings
- sudden incontinence
- dehydration
- signs of depression.