Title: Demonstrate how to provide mouth care for an edentulous resident.
Course: Nurse Aide (14051) > Section: Unit VIII: Personal Care Skills

Demonstration should include

- using foam-tipped applicators moistened with mouthwash (or half-strength mouthwash/hydrogen peroxide) to clean gums
- using applicators to clean the tongue
- rinsing the mouth with mouthwash.