Title: Compare different methods used to achieve medical asepsis.
Course: Nurse Aide (14051) > Section: Unit III: Infection Control

Comparison should include

- physically removing or killing pathogens using soap, water, antiseptics, disinfectants, and/or heat
- defining key terms and how each one is achieved
  - sanitation
  - antisepsis
  - disinfection
  - sterilization.