Title: Demonstrate CPR, including the use of an automated external defibrillator (AED), on an adult manikin (not required by regulation).
Course: Nurse Aide (14051) > Section: Unit V: Emergency Measures

Demonstration should include following the most current national guidelines for performing CPR.