Title: Explain the importance of and frequency of monitoring the resident while restraints/protective devices are in use.
Course: Nurse Aide (14051) > Section: Unit IV: Safety Measures

Explanation should include

- monitoring the resident at least every 15 minutes
- releasing the restraint every two hours.