Title: Identify emergency first aid procedures.
Course: Entertainment Design and Technology (05056-III) > Section: Applying Basic Safety Standards (Core Safety)

Identification should include standard first aid procedures and school policies for incidents involving

- bodily fluids
- electrical injuries
- eye injuries
- falls
- burns.

Process/Skill Questions:

- What steps should be followed in an accident?
- Why is knowing CPR an important skill within the construction trades?
- Why is it important to be certified to administer first aid?
- What are the different classifications (degrees) of electrical burns?