Title: Test and charge the battery.
Course: Basic Small Engine Repair (20109) > Section: Diagnosing and Servicing General Electrical System

Test should include an inspection of battery for leakage and physical damage, according to industry safety regulations, manufacturer's specifications, and instructor’s guidelines, by using a hydrometer and a load tester.

Process/Skill Questions:

- What diagnostic tools could be used to test a battery?
- What safety precautions would be used in testing/charging a battery?
- How does a battery lose charge?