Title: Inspect, adjust, and replace pneumatic system.
Course: Basic Small Engine Repair (20109) > Section: Diagnosing and Servicing Governor Systems

Process should include inspecting air intake screen, inspecting for debris in governor vane or linkage, replacing worn or broken parts, and adjusting governor to operate, according to manufacturer’s specifications and instructor’s guidelines.

Process/Skill Questions:

- What is an air governor?
- How does a pneumatic governor work?
- How is RPM set in a pneumatic system?