Title: Reassemble and adjust a diaphragm-type carburetor.
Course: Basic Small Engine Repair (20109) > Section: Diagnosing and Servicing Fuel System

Reassembly and adjustment must be made according to manufacturer’s specifications and instructor’s guidelines.

Process/Skill Questions:

- Where are the specifications for adjusting a carburetor located?
- What kind of tools are needed to reassemble a carburetor?
- Why should a diaphragm-type carburetor be adjusted after reassembly?