Title: Inspect and service mower decks.
Course: Basic Small Engine Repair (20109) > Section: Diagnosing and Servicing Lawn Mower

Inspection and service should include

- inspecting for rust
- inspecting for corrosion
- inspecting pulleys, breaks, belts, and bearings (if equipped)
- inspecting for physical damage
- inspecting for missing shields or safety devices
- removing foreign material from deck
- lubricating appropriate parts
- using manufacturer’s specifications and instructor’s guidelines.

Process/Skill Questions:

- How do you sharpen and balance a mower blade?
- What type of mower bearings are used on mower decks?
- How do you check for belt wear and why?