Title: Diagnose and determine needed repair on fuel system.
Course: Basic Small Engine Repair (20109) > Section: Diagnosing and Servicing Fuel System

Diagnosis should be made by visual inspection of filter elements and checking for restrictions, according to instructor’s guidelines.

Process/Skill Questions:

- What is the proper way to dispose of used gasoline?
- How often should fuel be tested for spoilage?
- Why should a fuel system maintain good fuel pressure?