Title: Demonstrate the use of administrative dental office technologies.
Course: Dental Careers II (14054-II) > Section: Performing Administrative Functions

Demonstration should include

- the basic operation of specific dental-office software, including user entry and editing systems
- appointment scheduling
- payment entries
- transferring patient records
- charting
- translation phones
- copy machines
- scanner
- adding machine
- FAX machine
- teledentistry.

Process/Skill Questions:

- How is an appointment scheduled for a specific operator?
- How is information for the day backed up?
- How is a schedule printed out?
- Why is it important to use user identification systems?