Title: Demonstrate mounting radiographs.
Course: Dental Careers II (14054-II) > Section: Performing Radiographic Procedures

Demonstration should include identifying the patient’s name, tooth number, and date and placing each radiograph in a full mouth series in the proper position in a frame.

Process/Skill Questions:

- Why is it important for the dental assistant to recognize anatomical landmarks?
- When mounting radiographs, what is the recommendation from the ADA concerning the placement of the raised dot?
- How should films be handled?