Title: Syllabus
Course: Renewable Energy (17105)

Copyright: 2021

Virginia Assignment Code: 8408

Suggested Grade Level: 11, 12

Duration: 36 weeks

Prerequisite: None

Course Description:

Renewable energy sources are steadily becoming more important in the global economy as nations strive to replace fossil fuels with eco-friendly power. In this course, students will explore select renewable energy technologies and gain hands-on experience in their design and function.