Title: Follow the nursing care plan or restorative plan of care.
Course: Patient Care Technician (14051-III) > Section: Demonstrating Medical Procedures and Patient Care and Comfort Measures

Following should include

- bowel and bladder retraining
- use of devices for feeding and dressing
- use of adaptive devices for activities of daily living
- assistance with orthotics, splints, or prosthetic devices (e.g., hearing aids, dentures, artificial eyes, extremities).

Process/Skill Questions:

- What types of patients/clients need assistance with bowel and bladder training?
- What are adaptive devices?