Title: Describe the interactions that occur at the tube target.
Course: Radiologic Technology II (14105-II) > Section: Exploring Radiologic Physics

Description should indicate the influence of the following factors on the X-ray emission spectrum:

- Milliamperage
- Kilovoltage
- Filtration
- Source-image distance
- Target material

Process/Skill Questions:

- What are the different types of energy?
- How does an automobile represent multiple energy conversions?
- X-rays are what form of energy?