Title: Complete a nationally recognized certification.
Course: Radiologic Technology II (14105-II) > Section: Exploring Careers in Radiologic Technology

Completion should result in successful fulfillment of the course requirements of a nationally recognized program, such as the American Heart Association (AHA), in

- cardiopulmonary resuscitation (CPR)
- CPR/automated defibrillator (AED)
- basic life support (BLS).

Process/Skill Questions:

- Why is it necessary to regularly update one’s training for BLS?
- What are the ABCDs of BLS? Why must they be done in a certain order?
- Why must everyone stand clear when a defibrillator is in use?