Title: Syllabus
Course: Radiologic Technology I (14105-I)

Copyright: 2019

Virginia Assignment Code: 8375

Suggested Grade Level: 11, 12

Duration: 36 weeks

Hours: N/A

Prerequisites: None

CTSO: HOSA-Future Health Professionals

Course Description:

Students will gain a basic understanding of the historical development and role of a radiologic technologist within the healthcare setting, as well as obtain basic knowledge of human anatomy, physiology, basic disease processes, and the essentials of patient care. This course will also explain the legal, ethical, and professional responsibilities associated with becoming a radiologic technologist, while emphasizing the importance of good communication and critical-thinking skills. Mastery of the material in this course would provide students with a strong background should they wish to pursue certification in areas such as first aid, CPR, or AED. Contextual instruction and student participation in co-curricular career and technical student organization (CTSO) activities will develop leadership, interpersonal, and career skills. High-quality work-based learning (HQWBL) will provide experiential learning opportunities related to students' career goals and/or interests, integrated with instruction, and performed in partnership with local businesses and organizations.

Note: This course has specific state laws and regulations from a governing medical board or agency. Please contact the Virginia Department of Education, Office of Career and Technical Education prior to implementing this course. All inquires may be sent to cte@doe.virginia.gov.

Credentials, Course Sequences, and Career Clusters/Pathways can be found here:

https://www.cteresource.org/career-clusters/health-science/radiologic-technology-i/