Title: Explain a programmable logic controller (PLC).
Course: Cybersecurity in Manufacturing (13002-III) > Section: Exploring Automated Tools Related to Manufacturing

Explanation may include

- ladder logic
- structured text
- function block diagram (FBD)
- sequential function chart (SFC)
- instruction list (IL).

Teacher Resource:

- What is a Programmable Logic Controller?

Process/Skill Questions:

- What are common inputs and outputs of a PLC?
- How is ladder logic incorporated in a PLC?
- How does structured text compare to a function block diagram?