Title: (Optional) Prepare shampoos and creme rinses.
Course: Veterinary Science I (18105-I) > Section: Performing Skin and Coat Care

Preparing should include

- using required PPE
- selecting shampoo appropriate to the animal’s skin type
- following all manufacturer instructions
- diluting shampoo, if needed
- preparing creme rinse returning all equipment to its proper place.

Process/Skill Questions:

- What is the difference between common shampoos? Why is each important?
- Why is it important to dilute shampoo according to label directions?
- Why is it important that the diluted shampoo be properly labeled?
- What is the procedure for mixing a shampoo that has a label reading "1:10 dilution"?
- Why are dips less common now? What are their dangers?