Title: Syllabus
Course: Medical Laboratory Technology II (14102-II)

Copyright 2021

Virginia Assignment Code: 8378

Suggested Grade Level: 12

Duration: 36 weeks

Prerequisite: 8377

Course Description:

In this hands-on course, students perform tests normally seen in the clinical setting as they build on the foundational knowledge and skills obtained in Medical Laboratory Technology I. The students will use the basic principles necessary to perform competently in the areas of clinical microbiology, immunohematology, and immunology/serology, coagulation/hemostasis, and molecular diagnostics. Competency includes performing the technique correctly, understanding the theory of the procedures, and interpreting the results.

Note: This course has specific state laws and regulations from a governing medical board or agency. Please contact the Virginia Department of Education, Office of Career and Technical Education prior to implementing this course. All inquiries may be sent to cte@doe.virginia.gov.