Title: Describe basic human anatomy and physiology in relation to molecular diagnostics.
Course: Medical Laboratory Technology II (14102-II) > Section: Understanding the Basics of Molecular Diagnostics

Description should include

- the structure and functions of deoxyribonucleic acid (DNA)
- nucleotides
- transcription/translation
- function of proteins.

Process/Skill Questions:

- How is a protein formed?
- What is the difference between the process of translation and transcription?