Title: Adhere to regulations regarding operational standards.
Course: Patient Care Technician (14051-III) > Section: Identifying the Roles and Responsibilities of a Patient Care Technician (PCT)

Adherence should include

- The Joint Commission
- Clinical Laboratory Safety Institute (CLSI)
- Clinical Laboratory Improvement Amendments
- Occupational Safety Health Administration (OSHA)
- Virginia Board of Nursing (VBON) and CNA certification.

Process/Skill Questions:

- What are the correct abbreviations and meanings of various accreditation agencies?
- What is the function of The Joint Commission?