Title: Monitor environmental safety.
Course: Patient Care Technician (14051-III) > Section: Practicing Safety Protocols

Monitoring should include

- fall precautions
- faulty equipment
- prevention of workplace injuries by following OSHA guidelines.

Process/Skill Questions:

- How can one prevent workplace injuries?
- What is the name of the form used for reporting an injury?