Title: Apply antiembolic devices.
Course: Patient Care Technician (14051-III) > Section: Preventing Medical Complications

Application should include

- circulation check
- check for skin breakdown
- placement of sequential compression devices
- placement of antiembolic stockings.

Process/Skill Questions:

- How often should compression devices be removed?
- How often should stockings be removed?
- Why is the toe area open?