Title: Design a game narrative.
Course: Game Design and Development (10205-I) > Section: Examining Narrative Design

Design should include

- characters
- conflict
- environment
- interactivity.

Process/Skill Questions:

- How do other media, such as film, fiction, and drama, inform game narrative?
- How might choices regarding these specifications affect gameplay?
- How might choices regarding these specifications affect the development process?