Title: Apply safe working practices around AC and DC circuits.
Course: Telecommunications I (10006-I) > Section: Understanding AC/DC Fundamentals

Application should include

- demonstrating compliance with safety standards in accordance with the National Electrical Code (NEC), the Occupational Safety and Health Administration (OSHA), and instructor guidelines
- identifying equipment used to test electrical circuits
- identifying resources available for workplace safety information
- demonstrating the proper use of personal protective equipment (PPE).

Process/Skill Questions:

- Why is it important to be familiar with NEC and OSHA regulations?
- What could happen if a technician ignores safety standards?
- What resources are available for workplace safety?