Title: Use a checklist to improve inspection readiness (e.g., wear and care of the uniform).
Course: Army JROTC II (09052-36)

Checklist should include branch-specific standards for wear and care of the

- coat
- trousers or slacks
- skirt
- shirt and sleeves
- neckwear
- hat/helmet/cap
- shoes
- socks
- insignia.

Process/Skill Questions:

- How is the torch of knowledge worn on the uniform?
- How is the female nameplate worn? How is the male nameplate worn?