Title: Identify the structures and functions of the urinary system.
Course: Radiologic Technology I (14105-I) > Section: Understanding Human Anatomy and Physiology

Identification should include

- the male and female reproductive systems
- the process of fertilization
- recognition of radiographic characteristics of the most common pathologies and how to compensate technical factors to accommodate.

Process/Skill Questions:

- What is the importance of normal kidney function before injecting iodinated contrast?
- What is the significance of ureteral reflux?
- What does an intravenous urogram (IVU) demonstrate?