Title: Perform housekeeping duties.
Course: Motorsports Technology I (20105-I) > Section: Applying Safety Practices

Performance should include organizing the lab (e.g., tools, work area, and storage) on a daily basis, according to customer service standards and customer and worker safety. It should also include managing supplies and inventory in an efficient manner.

Housekeeping duties should include

- keeping the duty station clean and safe for work
- keeping tools, workbenches, and manual equipment clean, maintained, and safe for work
- responding appropriately to safety hazards
- maintaining the cleanliness of the work area.

Process/Skill Questions:

- Why is it important to maintain a clean and orderly work area?
- What safety advantages result from good housekeeping?
- How can good housekeeping improve one's overall work efficiency?