Title: Maintain a clean, safe, and orderly work area.
Course: Television and Media Production I (11103-I) > Section: Practicing Safety on the Set and on Location

Maintenance should include

- unobstructed walkways
- secured cables
- safety harnesses on hanging equipment
- properly secured staging
- properly powering down and storing equipment.

Process/Skill Questions:

- Why is it important to maintain a clean lighting grid?
- Why is it important to use safety harnesses on lighting fixtures?
- When is it appropriate to use gloves in the studio?