Title: Maintain proper battery handling and disposal procedures.
Course: Television and Media Production I (11103-I) > Section: Production: Managing Equipment

Maintenance should include all procedures for proper care and disposal of the many types of batteries (e.g., rechargeable and non-rechargeable) used in audio/video equipment.

Process/Skill Questions:

- What procedures can be used for maintaining a battery charge in extreme (e.g., hot vs. cold) conditions?
- According to state and federal laws, what is the proper way to dispose of batteries? Who enforces these laws?
- What are the proper methods for storing batteries before traveling with them?