Title: Syllabus
Course: Pharmacy Technician II (14152-II)

Copyright: 2024

Virginia Assignment Code: 8306

Suggested Grade Level: 11, 12

Duration: 36 weeks

Hours: 280

Credits: 2

Prerequisites: 8305

CTSO: HOSA-Future Health Professionals

Course Description:

This certificate program is designed for students to apply advanced pharmacy practice, sterile compounding, non-sterile compounding, and inventory management. Successful completion of Pharmacy Technician I qualifies student to apply to Virginia Board of Pharmacy for clinical pharmacy technician trainee license. The coursework will fulfill the requirements of the Virginia Board of Pharmacy and prepare students to take national examinations, the Certified Pharmacy Technician (CPhT) Examination from the Pharmacy Technician Certification Board (PTCB) or the Examination for Certification of Pharmacy Technicians (ExCPT) from the National Healthcareer Association (NHA). Trained, experienced pharmacy technicians who can demonstrate clinical skills and knowledge, have many exciting and respected career options, and are well-positioned to pursue postsecondary study in the pharmacy field. Contextual instruction and student participation in co-curricular career and technical student organization (CTSO) activities will develop leadership, interpersonal, and career skills. High-quality work-based learning (HQWBL) will provide experiential learning opportunities related to students' career goals and/or interests, integrated with instruction, and performed in partnership with local businesses and organizations.

Satisfactory completion of standards involving compounding within the ASHP/ACPE ACCREDITATION STANDARDS FOR PHARMACY TECHNICIAN EDUCATION AND TRAINING PROGRAMS by persons who are under 18 years of age and registered with the Virginia Board of Pharmacy as a pharmacy technician trainee shall be met through manipulation of placebos (inert products) in a simulation environment and shall not involve physically mixing drugs together to produce a compounded drug product.

Note:

This course has specific state laws and regulations from a governing medical board or agency. Please contact the Virginia Department of Education Office of Career, Technical, and Adult Education prior to implementing this course. All inquiries may be sent to cte@doe.virginia.gov.

Pharmacy technician programs must maintain regulatory compliance for all enrolled students. For students to receive credit for completion of an accredited pharmacy technician training program, the program requirements must be met, to include both classroom and clinical portions of the program. Furthermore, clinical experiences must include a minimum of 130 hours in a dispensing pharmacy setting where the students will utilize skills learned during the course.

- The Virginia Department of Health Professions, Board of Pharmacy Regulations for pharmacy technician registration
- ASHP/ACPE Accreditation Standards

Credentials, Course Sequences, and Career Clusters/Pathways can be found here:

https://www.cteresource.org/career-clusters/health-science/pharmacy-technician-ii/