Title: Identify the technical manifestations of death, which may be of medicolegal significance.
Course: Introduction to Mortuary Science (14299) > Section: Recognizing Responsibilities of the Forensic Pathologist

Identification should include

- responsibility in case of injury or ailment
- burn injury
- vehicular accident
- suspected homicide
- poisoning
- sexual assault
- hospital deaths.

Process/Skill Questions:

- What are the procedures for maintaining the chain of evidence in a suspected criminal case?
- What are common signs of poisoning?
- What signs seen at a hospital death might warrant police involvement?