Title: Identify classifications of drawings.
Course: Building Trades I (17009-I) > Section: Core Construction Skills: Applying Fundamental Construction Skills

Identification should include types of plans, including

- civil
- architectural
- structural
- mechanical
- plumbing.

Process/Skill Questions:

- How would a drawing assist with window and door installation?
- Which drawing would one use to find the location of the house on the property?