Title: Analyze images and biosignals.
Course: Biomedical Engineering (21049) > Section: Exploring Medical Imaging and Bioinstrumentation

Analysis may include

- biometrics
- conversion of signals to numbers
- statistical analysis
- biosensors
- control systems
- image analysis (e.g., measuring size, shape, number, and location)
- low-, high-, band-pass filters
- edge detection
- applications for diagnosis or monitoring.

Process/Skill Questions:

- Why is it important to select the correct analytical tool? What criteria are used to select it?
- Why is understanding normalcy and its variabilities important?
- Why are ambient environmental factors (e.g., lighting, electrical noise, vibrations, temperature) important considerations when collecting and analyzing data?