Title: Create a user manual.
Course: Computer Network Software Operations, Advanced (10109-II) > Section: Providing User Training and Support

Creation should include

- selecting topics
- outlining the topics
- writing descriptions and instructions for the selected topics
- incorporating illustrations, where appropriate, in the manual
- verifying the accuracy of the manual.