Title: Lay out a block wall.
Course: Masonry I (17008-I) > Section: Laying Concrete Masonry Units

Laying out consists of using a measuring tape or ruler to bond a wall on 16-inch intervals to establish proper spacing of block.

Process/Skill Questions:

- Why do masons use a level to lay out a block wall?
- How many blocks should be laid out in an 8-foot wall?

NCCER Masonry Standards

Level One, Module Six (28105-13): Masonry Units and Installation Techniques

This module describes characteristics of block and brick; how to set up, lay out, and bond block and brick; how to cut block and brick; how to lay and tool block and brick; and how to clean block and brick once they have been laid. This module also provides information about masonry reinforcements and accessories that masons use on the job to lay block and brick professionally and safely.