Title: Prepare basic operatory setup.
Course: Dental Careers I (14054-I) > Section: Demonstrating Administrative Functions and Chairside Procedures

Preparation should include instrumentation and arrangement of disposable armamentarium.

Process/Skill Questions:

- What instruments are included in the basic setup?
- What is the order of use for the basic setup?
- What are at least three disposable items included in the basic setup?