Title: Explain oral embryology and the histology of dentition.
Course: Dental Careers I (14054-I) > Section: Describing Dental Anatomy

Explanation should include the names and functions of parts and tissues of the teeth and surrounding structures, such as

- alveolar process
- cementum
- dentin
- enamel
- gingiva
- lamina dura
- periodontal ligament
- pulp.

Process/Skill Questions:

- What are the three stages of differentiation?
- What is the result of fusion failure of the palatal shelves?
- What are the four stages of the life cycle of the tooth?