Title: (Optional) Maintain a park or campground area.
Course: Agricultural Education - Preparation (18003-II) > Section: Investigating Parks and Natural Resource Management

Maintenance should include

- using required PPE
- practicing fire safety
- leaving sites as they were discovered
- placing garbage in appropriate containers or packing it
- storing items in the campground area.

Process/Skill Questions:

- What should one do with garbage if a trash can is not available?
- How should one interact with wildlife?
- Where should all food items be stored?
- What animals may visit a campground, and how might one protect both the animals and the people?
- What are the steps to extinguish an open fire?