Title: (Optional) Demonstrate the procedures for starting a reciprocating aircraft engine.
Course: Aviation Maintenance Technology I (20114-I) > Section: Maintaining the Power Plant

Demonstration should include

- locating aircraft flight manual (AFM) or pilot’s operating handbook (POH)
- adhering to safety precautions and walk-around inspection of the aircraft
- following procedure for starting found in the associated checklist.

Process/Skill Questions:

- Where does one find the information about starting an aircraft?
- What should be done before starting an aircraft engine?