Title: (Optional) Explain the functions of the engine oil system and how the system is monitored in the cockpit.
Course: Aviation Maintenance Technology I (20114-I) > Section: Maintaining the Power Plant

Explanation should include the following:

- Oil is stored in a tank and delivered to engine components by way of the oil pump.
- Oil pump pressure is monitored by an oil-pressure gauge located in the cockpit.

Process/Skill Questions:

- How is oil supplied to an engine?
- What is the purpose of oil in an engine?