Title: (Optional) Explain the operation of the air cooling system and how the system is monitored in the cockpit.
Course: Aviation Maintenance Technology I (20114-I) > Section: Maintaining the Power Plant

Explanation should include the following:

- Ram air is forced over the cylinders and out the bottom of the aircraft.
- The cowling provides the pressurized path for cooling airflow.
- The cylinder head temperature is monitored by a gauge in the cockpit.

Process/Skill Questions:

- How does an aircraft direct air over the engine for cooling?
- How is engine temperature monitored?