Title: Maintain record entries for a specific aviation maintenance task.
Course: Aviation Maintenance Technology I (20114-I) > Section: Interpreting Maintenance Publications, Forms, and Records

Maintenance of records should include documentation of parts and procedures used in the repair.

Process/Skill Questions:

- What details are listed in a maintenance entry?
- When must a mechanic make a maintenance entry?