Title: Define standard of care.
Course: Emergency Medical Telecommunications (14055-V) > Section: Understanding Legal and Liability Issues in EMD

Definition should include

- what standard of care is
- types of standards of care
- measures for establishing a standard of care.

Process/Skill Questions:

- What measures are included in the standard of care involving emergency medical telecommunications?
- What member of the team will enforce the standard of care?