Title: Operate lab equipment according to instructor guidelines.
Course: Production Systems (13101-36) > Section: Practicing Safety

Operation should include

- following posted safety rules for each piece of equipment
- possessing an awareness of technical instructions/standard operating procedures
- using guards as required
- passing a proficiency demonstration with the instructor.

Process/Skill Questions:

- How are the posted safety rules for any two pieces of equipment similar and different?
- Why are guards necessary?
- Why is passing a proficiency demonstration with the instructor critical?