Title: Demonstrate special safety procedures required for outside equipment.
Course: Telecommunications I (10006-I) > Section: Practicing Safety

Demonstration should include

- using protective barriers in public work areas
- using tools and personal protective equipment (PPE)
- using rubber insulation
- using climbing-lineman body belts, lanyards, and safety straps
- using ladders
- using and grounding portable power equipment.

Process/Skill Questions:

- What are the implications of not understanding the proper use of outside safety equipment?
- What resources are available for locating information on personal protective equipment (PPE)?
- How is cooperation vital in performing safe outside telecommunications work?
- What causes most falls?