Title: Record the air governor cut-in and cut-out settings.
Course: Diesel Equipment Technology I (20107-I) > Section: Preventive Maintenance and Inspection: Servicing the Air Brakes

Record should include operating the air governor cut-in and cut-out,  according to manufacturer guidelines.

Process/Skill Questions:

- How would one determine when the air pressure indicated meets manufacturer guidelines?
- What are some common causes for air pressure not meeting manufacturer guidelines?