Title: Inspect the fluid levels.
Course: Diesel Equipment Technology I (20107-I) > Section: DIESEL ENGINES: General

Inspection should include visually checking the levels and condition of

- fuel
- oil
- diesel exhaust fluid (DEF)
- coolant

and determining the necessary action.

Process/Skill Questions:

- What should the ratio of water to antifreeze be?
- How does one take an oil or coolant sample?