Title: Inspect the turbocharger for leaks.
Course: Diesel Equipment Technology I (20107-I) > Section: Preventive Maintenance and Inspection: Servicing Air Induction and Exhaust System

Inspection should include

- checking for leaks on the suction side and the pressure side
- checking the four mounting bolts securing the turbocharger to the exhaust manifold.

Process/Skill Questions:

- What problems could a leak on the suction side of the turbocharger cause?
- What problems could a leak on the exhaust side of the turbocharger cause?