Title: Check the operation of all accessories.
Course: Diesel Equipment Technology I (20107-I) > Section: Preventive Maintenance and Inspection: Servicing the Cab and Hood Instruments and Controls

Checking should include inspecting and testing, based on

- guidelines from the manufacturer
- description of normal operation
- identification of accessory systems.

Process/Skill Questions:

- How would each accessory and its benefits be described?
- What document explains testing of the accessories?