Title: Check the parking brake operation.
Course: Diesel Equipment Technology I (20107-I) > Section: Preventive Maintenance and Inspection: Servicing the Hydraulic Brakes

Checking should include inspecting and testing, based on

- manufacturer guidelines
- the description of normal operation.

Process/Skill Questions:

- What may cause the parking brake system not to work properly?
- How would the parking brake be adjusted?