Title: Check the antilock brake system (ABS) wiring, connectors, seals, and harnesses for damage and proper routing.
Course: Diesel Equipment Technology I (20107-I) > Section: Preventive Maintenance and Inspection: Servicing the Air Brakes

Checking should include

- conducting a visual inspection of the wiring harness
- inspecting the components, according to service materials, owner manual, and manufacturer guidelines.

Process/Skill Questions:

- What inspection procedure should be performed on the wiring, connectors, and seals?
- What advantage do quick disconnect connectors and waterproof connectors provide?