Title: Perform the battery test (load and/or capacitance).
Course: Diesel Equipment Technology I (20107-I) > Section: Preventive Maintenance and Inspection: Servicing the Battery and Starting System

Performance should include a

- capacitance test
- slow/fast battery charge.

Process/Skill Questions:

- Why is slow charging preferred?
- How would one charge an AGM battery?
- What gas is produced when charging a battery?