Title: Inspect the exhaust gas recirculation (EGR) system.
Course: Diesel Equipment Technology I (20107-I) > Section: Preventive Maintenance and Inspection: Servicing Air Induction and Exhaust System

Inspection should include following all inspection guidelines for all the EGR components.

Process/Skill Questions:

- What is the purpose of the EGR system?
- What issues will a failed EGR system cause?