Title: Identify the battery types and system configuration.
Course: Diesel Equipment Technology I (20107-I) > Section: Electrical/Electronic Systems: Servicing the Battery

Identification should include

- types of batteries
- configuration of battery and cable routing
- safety practices with 12v and 24v systems.

Process/Skill Questions:

- What are the types of batteries?
- How does cable routing and size affect voltage?