Title: Inspect the valves, guides, seats, springs, retainers, rotators, locks, and seals.
Course: Diesel Equipment Technology I (20107-I) > Section: Diesel Engines: Servicing the Cylinder Head and Valve Train

Inspection should include

- following manufacturer guidelines for the disassembly of the cylinder head
- using tools suggested by the manufacturer for disassembly
- following manufacturer guidelines for the reusability guidelines of each part
- determining the necessary action.

Process/Skill Questions:

- What precision measuring tools would one expect to use when inspecting the parts for potential reuse?
- What are the possible consequences of failure to follow the manufacturer guidelines?