Title: Inspect the exhaust manifold, piping, EGR, aftertreatment, mufflers, and mounting hardware.
Course: Diesel Equipment Technology I (20107-I) > Section: Diesel Engines: Servicing the Air Induction and Exhaust Systems

Inspection should include

- performing a visual inspection of the manifold, the muffler, and all connections
- replacing hardware as required.

Process/Skill Questions:

- What are the signs of an exhaust manifold leak?
- Why is an exhaust manifold leak a serious problem on a turbocharged engine?