Title: Inspect the wiper blades and arms.
Course: Diesel Equipment Technology I (20107-I) > Section: Preventive Maintenance and Inspection: Servicing the Cab and Hood Safety Equipment

Inspection should include

- checking the wiper blades and arms for proper operation
- referring to service materials
- following manufacturer guidelines.

Process/Skill Questions:

- What is the procedure to replace wiper blades?
- What can occur if the wiper arms are bent or in a bind?