Title: Inspect the water pump and hoses.
Course: Diesel Equipment Technology I (20107-I) > Section: Diesel Engines: Servicing the Cooling Systems

Inspection should include

- visually examining the water pump and hose
- clearing the weep hole of debris, if applicable
- replacing, as needed.

Process/Skill Questions:

- How should a water pump be inspected and how often?
- What is the purpose of a weep hole?
- What safety precautions should be taken when replacing a water pump?
- What are the procedures to replace a water pump?