Title: Inspect the brake assist system (booster), hoses, control valves, and reservoir fluid level and condition.
Course: Diesel Equipment Technology I (20107-I) > Section: Preventive Maintenance and Inspection: Servicing the Hydraulic Brakes

Inspection should include visually checking the

- brake assist (booster), hoses, and control valves
- reservoir fluid level and condition.

Process/Skill Questions:

- What should be done when the reservoir fluid level is low?
- What should be done when the reservoir fluid level is contaminated?
- What should be done when the brake assist system does not operate according to manufacturer specifications?