Title: Check the operation of electronic power take off (PTO) and engine idle speed controls, if applicable.
Course: Diesel Equipment Technology I (20107-I) > Section: Preventive Maintenance and Inspection: Servicing the Cab and Hood Instruments and Controls

Checking should include operating electronic PTO controls and noting RPM changes.

Process/Skill Questions:

- How did the electronic power take off (PTO) operate?
- How did the RPM change (if applicable)?