Title: Change the transmission oil and filter, if applicable.
Course: Diesel Equipment Technology I (20107-I) > Section: Preventive Maintenance and Inspection: Servicing the Drive Train

Changing should include

- following manufacturer guidelines
- adhering to the maintenance schedule.

Process/Skill Questions:

- What is severe duty? What is normal duty?
- What is the service interval between normal and severe duty?
- What are consequences of failing to change the transmission oil?