Title: Check the kingpins for wear.
Course: Diesel Equipment Technology I (20107-I) > Section: Preventive Maintenance and Inspection: Servicing the Drive Train

Checking can be done by following DOT or manufacturer guidelines.

Process/Skill Questions:

- What signs might indicate kingpin wear?
- What is the purpose of using a dial indicator?
- What other specifications may axle manufacturers use besides 0.010?