Title: Inspect the radiator and mountings.
Course: Diesel Equipment Technology I (20107-I) > Section: Preventive Maintenance and Inspection: Servicing the Cooling System

Inspection should include checking the air flow restriction, leaks, and damage, in addition to

- performing a visual inspection of the radiator core for debris and leaks
- using an air flow meter
- inspecting the top and bottom mounting brackets for the radiator.

Process/Skill Questions:

- Where would one record the highest volume of air passing through the radiator core while using the air flow meter?
- How does one know if there is a blocked core?