Title: Inspect the disc brake pads and mounting hardware.
Course: Diesel Equipment Technology I (20107-I) > Section: Brakes: Servicing the Mechanical/Foundation Brakes

Inspection should include

- removing the caliper assembly
- replacing the pads, according to manufacturer guidelines.

Process/Skill Questions:

- What are the procedures to remove pads?
- How often should the pads be checked and replaced?
- How is pad composition determined? Why is this information important?