Title: Record all observed physical damage.
Course: Diesel Equipment Technology I (20107-I) > Section: Preventive Maintenance and Inspection: Servicing the Cab and Hood Hardware

Record should include

- visually inspecting the entire vehicle for physical damage to any component
- referring to manufacturer guidelines
- noting anything that interferes with normal operation of components.

Process/Skill Questions:

- What should be recommended when physical damage is evident?
- How can physical damage be documented (e.g., pictures, drawings)?
- How should all physical damage be notated on the inspection form?