Title: Clean the battery boxes, mounts, and hold downs.
Course: Diesel Equipment Technology I (20107-I) > Section: Electrical/Electronic Systems: Servicing the Battery

Cleaning should include

- battery case and terminals
- battery hold downs and trays.

Process/Skill Questions:

- What precautions should be taken when servicing a battery?
- What product(s) can neutralize battery acid?