Title: Check the engine starting and operation.
Course: Diesel Equipment Technology I (20107-I) > Section: Preventive Maintenance and Inspection: Servicing the Engine

Checking should include

- checking the oil and coolant levels before starting the engine
- following manufacturer guidelines (e.g., glow plugs/intake heater)
- recording RPM, oil PSI, and voltage
- noting unusual noises, color of smoke, and vibrations.

Process/Skill Questions:

- What is the difference between white exhaust smoke and steam?
- What would one look for in a walk-around inspection after an engine starts?