Title: Inspect the alternator, mountings, cable, wiring, and wiring routing.
Course: Diesel Equipment Technology I (20107-I) > Section: Preventive Maintenance and Inspection: Servicing the Charging System

Inspection should be completed according to service materials and manufacturer guidelines.

Process/Skill Questions:

- What inspection procedure should one perform on cables and wiring?
- What happens when an alternator mounting is loose or misaligned?