Title: Inspect the starter, mounting, and connections.
Course: Diesel Equipment Technology I (20107-I) > Section: Preventive Maintenance and Inspection: Servicing the Battery and Starting System

Inspection should include checking the starter, according to service materials and manufacturer guidelines.

Process/Skill Questions:

- What should be inspected when checking the mounting of a starter motor?
- What can happen if cables are loose or dirty?
- What can happen if mounting bolts are loose?
- What is the difference  between a wired ground and a starter mounting ground?