Title: Inspect the disc brake caliper assemblies.
Course: Diesel Equipment Technology I (20107-I) > Section: Brakes: Servicing the Hydraulic Brakes

Inspection should include

- checking for binding components
- identifying the problem(s) in caliper operation.

Process/Skill Questions:

- What lubricant is used for floating calipers?
- What indicates abnormal wear of brake pads?
- How does one check caliper clearance?