Title: Inspect the battery box(es), cover(s), and mountings.
Course: Diesel Equipment Technology I (20107-I) > Section: Preventive Maintenance and Inspection: Servicing the Battery and Starting System

Inspection should include checking and cleaning the battery hold-downs and trays.

Process/Skill Questions:

- What can occur when a battery is loose?
- What conditions cause replacement of the cover (i.e., missing, broken, unable to secure)?