Title: Check the exhaust system mountings for looseness and damage.
Course: Diesel Equipment Technology I (20107-I) > Section: Preventive Maintenance and Inspection: Servicing Air Induction and Exhaust System

Checking should include

- visually inspecting all exhaust system clamps, hangers, and hardware
- recording the findings.

Process/Skill Questions:

- What could happen to an engine if the baffles inside a muffler “break up?”
- Why is it important to record the findings?
- Why is it important to inspect the DEF vent filter?