Title: Perform the appropriate battery load test.
Course: Diesel Equipment Technology I (20107-I) > Section: Electrical/Electronic Systems: Servicing the Battery

Performance should include

- exploring the load and high-rate discharge
- referring to service materials and manufacturer guidelines.

Process/Skill Questions:

- Where can a cold cranking amperage (CCA) rating be found?
- Why would a frozen battery be tested?
- What tools are used to perform the battery capacity test?