Title: Perform general banking procedures.
Course: Medical Administration (14153-18) > Section: Managing Financial Activities

Performance should include

- preparing deposit slips
- endorsing checks
- making deposits
- writing checks
- banking electronically, if office policy permits
- counting money
- reconciling bank statements with office bookkeeping records
- coordinating armored truck pick up services for deposits.