Title: Follow federal, state, and local standards, regulations, and procedures.
Course: Small Engine Repair (20110-36) > Section: Applying Safety Practices

Following all safety standards, regulations, and procedures may include the following federal, state, and local agencies

- U.S. Environmental Protection Agency (EPA)
- Occupational Safety and Health Administration (OSHA)
- Equipment and Engine Training Council (EETC)
- Education Committee Safety Data Sheets (SDS).

Process/Skill Questions:

- What procedure should students follow in case of an emergency or accident?
- What is the importance of following agency guidelines?
- Where do you find these guidelines?