Title: Maintain a safe working environment.
Course: Electronics/Industrial Robotics Technology (17101-I) > Section: Applying Basic Construction Safety Standards (Core Safety)

Maintenance should be ongoing and should result in identifying potential hazards on a jobsite or in the lab, such as

- electrical hazards
- jobsite debris
- improperly stored materials
- air quality hazards.

When present, these must be remedied in compliance with school and instructor's guidelines.

Process/Skill Questions:

- What are some examples of jobsite hazards?
- Why is it important to adhere to safety standards on a jobsite?
- Why is it important to store materials and tools properly?
- Why is important to protect humans when working with industrial robots?
- Why is it important to avoid contact with hydraulic fluid?